hcl0

Entries 1096 Mean 1.922e+04 RMS 1066

14000 15000 16000 17000 18000 19000 20000 21000 0

10

20

30

40

50 classic 0 weight htemp_{Entries 1081}

Mean 25.26 RMS 133.9

-500 0 500 1000 1500 2000 1

10

210

310 htemp

Entries 1081

CFirst0.T-f2kRead_FIT_17.T {CFirst0.T<100000&&f2kRead_FIT_17.T<100000&&CFirst0.T>0&&f2kRead_FIT_17.T>0} htemp

Entries 1096 Mean 41.89 RMS 92.58

-600-400-200 0 200 400 600 80010001200 1

10

210 htemp

f2kRead_FIT_17.T-f2kRead_FIT_2.T {f2kRead_FIT_17.T<100000&&f2kRead_FIT_2.T<100000&&f2kRead_FIT_17.T>0&&f2kRead_FIT_2.T>0}

hcl1

Entries 1096 Mean 1.923e+04 RMS 1067

14000 15000 16000 17000 18000 19000 20000 21000 0 5 10 15 20 25 30 35 40 45 classic 0 weight htemp_{Entries 1084}

Mean 16.09 RMS 115.1

-1000 -500 0 500 1000 1

10

210 htemp

Entries 1084

CFirst1.T-f2kRead_FIT_22.T {CFirst1.T<100000&&f2kRead_FIT_22.T<100000&&CFirst1.T>0&&f2kRead_FIT_22.T>0} htemp

Entries 1095 Mean 57.31 RMS 104.6

-500 0 500 1000 1500 1

10

210 htemp

f2kRead_FIT_22.T-f2kRead_FIT_7.T {f2kRead_FIT_22.T<100000&&f2kRead_FIT_7.T<100000&&f2kRead_FIT_22.T>0&&f2kRead_FIT_7.T>0}