BB 1981

ALLM 97

Energy Μ GeV Ν photonuclear energy losses per energy Μ g^{-1}cm^2 Ν

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 x 10^{-5}

10^3 10^4 10^5 10^6 10^7 10^8