string 21 string 39

zenith anlge Μ degrees Ν entries

0 20 40 60 80 100 120 140 160 180 200

0 20 40 60 80 100 120 140 160 180 string 21 string 39 distance cut: 10 m

zenith anlge Μ degrees Ν entries

0 2 4 6 8 10 12 14 16 18 20

0 20 40 60 80 100 120 140 160 180 hist: 0.04 Α 31.41 fit: -0.28 Α 22.59 string 21 - 39

reconstructed zenith angle (simple reco) Μ degrees Ν entries

1

10

10^2

10^3

-80 -60 -40 -20 0 20 40 60 80 hist: 0.17 Α 26.38 fit: -0.66 Α 18.34 string 21 - 39

reconstructed zenith angle (joint reco) Μ degrees Ν entries

1

10

10^2

10^3

-80 -60 -40 -20 0 20 40 60 80 hist: -0.66 Α 22.83 fit: -0.28 Α 8.61 string 21 - 39

distance cut: 10 m

reconstructed zenith angle (simple reco) Μ degrees Ν entries

1

10

10^2

10^3

-80 -60 -40 -20 0 20 40 60 80 hist: -1.13 Α 12.67 fit: 0.11 Α 6.76 string 21 - 39

distance cut: 10 m

reconstructed zenith angle (joint reco) Μ degrees Ν entries

1

10

10^2

10^3

-80 -60 -40 -20 0 20 40 60 80