string 21 all strings

zenith anlge Μ degrees Ν entries

0 50 100 150 200 250 300 350 400

0 20 40 60 80 100 120 140 160 180 full multiplicity string 21 all strings

N_{ch} entries

1

10

10^2

10^3

0 50 100 150 200 250 300 hist: -1.55 Α 17.17 fit: 0.21 Α 1.57 string 21 - all strings

reconstructed zenith angle (simple reco) Μ degrees Ν entries

1

10

10^2

10^3

-80 -60 -40 -20 0 20 40 60 80 hist: -0.41 Α 13.35 fit: 0.30 Α 1.60 string 21 - all strings

reconstructed zenith angle (joint reco) Μ degrees Ν entries

1

10

10^2

10^3

-80 -60 -40 -20 0 20 40 60 80