neutrino signal corsika showers data, SBM step 1 data, SBM step 2

log_{10}(E_{reco}(COG) Μ GeV Ν) entries

10^{-2}

10^{-1}

1

10

2 2.5 3 3.5 4 4.5 5 5.5 6 6.5 7