zenith angle Μ degrees Ν

distance from the string Μ m Ν data simulation

0 1000

2000

3000

4000

5000

6000

7000

0 20 40 60 80 100 120 140 160 180

1 10 10^2

10^3

10^4

0 20 40 60 80 100 120 140 160 180 200 muon energy estimate uncertainty data simulation

energy Μ GeV Ν

0 2000

4000

6000

8000

10000

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

1 10 10^2

10^3

10^4

1 10 10^2 10^3 10^4 10^5 10^6