ΛdE/dxΓ=a+bE a=0.260 Μ GeV/mwe Ν, b=0.360 Μ 10^{-3}/mwe Ν

Λ(δE^2/dx)Γ^{1/2}=a^*+b^*E a^*=-0.522 Μ GeV/mwe^{1/2} Ν, b^*=8.893 Μ 10^{-3}/mwe^{1/2} Ν

energy Μ GeV Ν total energy losses Μ GeV/mwe Ν

10^{-1}

1

10

10^2

10^3

10^4

10^3 10^4 10^5 10^6