dE/dx=a+bE a=0.218 Μ GeV/mwe Ν, b=0.520 ⋅ 10^{-3}Μ 1/mwe Ν

energy Μ GeV Ν average displacement Μ mwe Ν

10^{-2}

10^{-1}

1

10

10^2

10^3

10^4

10^5

10^{-1} 1 10 10^210^310^410^510^610^710^810^910^{10}