time Μ s Ν laser t_0 mismatch Μ ns Ν

-1.5

-1.25 -1 -0.75

-0.5

-0.25 0 0.25 0.5 0.75 1

0 20 40 60 80 100 120 140 160

RMS: 0.195

RMS: 0.088

laser t_0 mismatch Μ ns Ν entries Μ ⋅ 10^5 Ν

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

-1.25 -1 -0.75 -0.5 -0.25 0 0.25 0.5 0.75 1