DOR side centroid le threshold le intercept

DOM side crossover

Comm ADC Tcal waveform DOM ID: 0xa727fddbb7f4 0

200

400

600

800

1000

0 5 10 15 20 25 30 35 40 45

DOR side centroid le threshold le intercept

DOM side crossover

Comm ADC Tcal waveform DOM ID: 0xa48aaec81ca3 0

200

400

600

800

1000

0 5 10 15 20 25 30 35 40 45

DOR side centroid le threshold le intercept

DOM side crossover

Comm ADC Tcal waveform DOM ID: 0x8cc775dded6b 0

200

400

600

800

1000

0 5 10 15 20 25 30 35 40 45