x ΜmΝ y ΜmΝ log likelihood

x_{min} = 0.273 ± 1.284 ΜmΝ y_{min} = -3.204 ± 1.127 ΜmΝ z_{min} = 8.261 ± 0.882 ΜmΝ δx_{min} = 33.91 ± 1.88 ΜmΝ δy_{min} = 35.23 ± 2.66 ΜmΝ δz_{min} = 29.43 ± 1.72 ΜmΝ

log likelihood for OM 379 at z = 8 m

-20-15

-10 -5 0 5 10 15 20

-15 -10 -5 0 5 10 15 20 7.6 7.7 7.8 7.9 8 8.1 8.2 8.3 8.4 8.5