x ΜmΝ y ΜmΝ log likelihood

x_{min} = 5.088 ± 2.032 ΜmΝ y_{min} = -9.165 ± 2.793 ΜmΝ z_{min} = 16.928 ± 2.373 ΜmΝ δx_{min} = 43.27 ± 7.03 ΜmΝ δy_{min} = 52.63 ± 9.97 ΜmΝ δz_{min} = 41.42 ± 4.66 ΜmΝ

log likelihood for OM 344 at z = 16 m

-20-15

-10 -5 0 5 10 15 20

-15 -10 -5 0 5 10 15 20 8 8.1 8.2 8.3 8.4 8.5 8.6 8.7