x ΜmΝ y ΜmΝ log likelihood

x_{min} = 4.288 ± 1.581 ΜmΝ y_{min} = -7.993 ± 1.381 ΜmΝ z_{min} = 26.102 ± 1.734 ΜmΝ δx_{min} = 72.33 ± 5.04 ΜmΝ δy_{min} = 65.23 ± 3.63 ΜmΝ δz_{min} = 73.01 ± 5.49 ΜmΝ

log likelihood for OM 344 at z = 30 m

-50-40

-30-20

-100

1020

3040 50

-40 -30 -20 -10 0 10 20 30 40 50

8 8.2 8.4 8.6 8.8 9 9.2