x ΜmΝ y ΜmΝ log likelihood

x_{min} = 0.869 ± 1.147 ΜmΝ y_{min} = -4.457 ± 1.182 ΜmΝ z_{min} = 10.000 ± 0.452 ΜmΝ δx_{min} = 32.50 ± 5.46 ΜmΝ δy_{min} = 35.13 ± 6.43 ΜmΝ δz_{min} = 32.20 ± 1.53 ΜmΝ

log likelihood for OM 425 at z = 10 m

-10-8

-6 -4

-2 0 2 4 6 8 10

-8 -6 -4 -2 0 2 4 6 8 10 7.2 7.25 7.3 7.35 7.4 7.45 7.5