x ΜmΝ y ΜmΝ log likelihood

x_{min} = 5.178 ± 0.569 ΜmΝ y_{min} = -9.988 ± 0.430 ΜmΝ z_{min} = 69.101 ± 1.036 ΜmΝ δx_{min} = 89.65 ± 0.99 ΜmΝ δy_{min} = 83.48 ± 0.84 ΜmΝ δz_{min} = 104.68 ± 1.71 ΜmΝ

log likelihood for OM 425 at z = 60 m

-100-80

-60-40

-200

2040

6080 100

-80 -60 -40 -20 0 20 40 60 80 100

7 7.5 8 8.5 9 9.5 10