x ΜmΝ y ΜmΝ log likelihood

x_{min} = 5.623 ± 0.506 ΜmΝ y_{min} = -8.837 ± 0.510 ΜmΝ z_{min} = 43.105 ± 1.298 ΜmΝ δx_{min} = 58.44 ± 1.10 ΜmΝ δy_{min} = 59.50 ± 1.20 ΜmΝ δz_{min} = 75.15 ± 2.05 ΜmΝ

log likelihood for OM 425 at z = 40 m

-50-40

-30-20

-100

1020

3040 50

-40 -30 -20 -10 0 10 20 30 40 50

7 7.25 7.5 7.75 8 8.25 8.5 8.75