N ⋅ exp( -dt/τ ) N = 37196.9 τ = 0.0155172 ΜsΝ true rate is 64.4445 ΜHzΝ data rate is 55.4149 ΜHzΝ live time is 85.9886 %

time deltas Μ s Ν number of events

1

10

10^2

10^3

10^4

10^5

0.02 0.04 0.06 0.08 0.1 0.12 0.14