mc_i0 N=0.904614 ± 0.0828132 z=-0.000676519 ± 0.000664988 mc_i+0.1 N=0.564055 ± 0.0504632 z=0.000642536 ± 0.000739078 mc_i-0.1 N=1.69521 ± 0.114603 z=-0.00282249 ± 0.000480068

rate data Μ Hz Ν rate mc/data

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

2 3 4

0 20 40 60 80 100 120 140 160 180 200