Spectral index is 0.0540405 ± 0.0243595

mc spectral index correction slope mc/data Μ x10^{-3} Ν

-10 -8 -6 -4 -2 0 2 4 6 8

-0.2 -0.15 -0.1 -0.05 0 0.05 0.1 0.15 0.2