mc, 0 N=1.81468 ± 0.127852 z=-0.00579743 ± 0.000916632 mc, 0.1 N=1.13757 ± 0.226337 z=-0.00396981 ± 0.00249613 mc, -0.1 N=2.10896 ± 0.177665 z=-0.00489646 ± 0.00104222 mc, -0.2 N=5.98381 ± 0.350403 z=-0.0129124 ± 0.000820237 mc, 0.2 N=0.37539 ± 0.0451584 z=0.0029531 ± 0.00156013

rate data Μ Hz Ν rate mc/data

10^{-1}

1

10

0 25 50 75 100 125 150 175 200 225 250