mc, 0 N=2.20734 ± 0.247796 z=-0.00485555 ± 0.00157312 mc, 0.1 N=0.990708 ± 0.183402 z=0.00196901 ± 0.00249477 mc, -0.1 N=4.55187 ± 0.475944 z=-0.0101018 ± 0.00150873 mc, -0.2 N=8.82304 ± 2.53442 z=-0.0137192 ± 0.00423838 mc, 0.2 N=0.717515 ± 0.283795 z=0.00268485 ± 0.00534331

rate data Μ Hz Ν rate mc/data

10^{-1}

1

10

0 25 50 75 100 125 150 175 200 225 250