mc, 0 N=0.73471 ± 0.120589 z=-0.000838508 ± 0.00211389 mc, 0.1 N=0.513136 ± 0.0885986 z=0.00129887 ± 0.00217559 mc, -0.1 N=1.45811 ± 0.197719 z=-0.00495631 ± 0.00181458 mc, -0.2 N=2.18382 ± 0.223802 z=-0.00399487 ± 0.00136322 mc, 0.2 N=0.274576 ± 0.0915701 z=0.00262591 ± 0.00416014

rate data Μ Hz Ν rate mc/data

10^{-1}

1

10

0 25 50 75 100 125 150 175 200 225 250