mc, 0 N=0.965813 ± 0.109069 z=-0.00345567 ± 0.00163956 mc, 0.1 N=0.390196 ± 0.0551994 z=0.00172785 ± 0.00191562 mc, -0.1 N=1.3756 ± 0.143104 z=-0.00329108 ± 0.00150435 mc, -0.2 N=3.07399 ± 0.287321 z=-0.0078279 ± 0.00142692 mc, 0.2 N=1.01799 ± 0.531423 z=-0.011868 ± 0.00842829

rate data Μ Hz Ν rate mc/data

10^{-1}

1

10

0 25 50 75 100 125 150 175 200 225 250