mc, 0 N=0.726907 ± 0.2524 z=0.00124996 ± 0.0046524 mc, 0.1 N=0.430081 ± 0.174139 z=0.00481944 ± 0.00517824 mc, -0.1 N=1.58018 ± 0.150409 z=-0.00465036 ± 0.00137648 mc, -0.2 N=2.66709 ± 0.799504 z=-0.00839786 ± 0.0046029 mc, 0.2 N=0.208509 ± 0.126354 z=0.00694061 ± 0.0074429

rate data Μ Hz Ν rate mc/data

10^{-1}

1

10

0 25 50 75 100 125 150 175 200 225 250