mc_i0 N=1.58663 ± 0.0108077 z=-0.00508261 ± 0.000101659 mc_i+0.1 N=1.20607 ± 0.010341 z=-0.00525933 ± 0.000128002 mc_i-0.1 N=2.09865 ± 0.0187101 z=-0.00475208 ± 0.000132996

rate data Μ Hz Ν rate mc/data

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

2 3 4

0 20 40 60 80 100 120 140 160 180 200