x, ΜmΝ y, ΜmΝ ln χ^2

x_{min} = 2.05225 ± 0.23787 y_{min} = -2.75663 ± 0.10969 z_{min} = 0.201761 ± 0.122445 δx_{min} = 108.331 ± 5.2966 δy_{min} = 120.95 ± 3.4133 δz_{min} = 68.7724 ± 10.0431

ln χ^2, for OM 480 at z = 0 m

-1 -0.6

-0.2 0.2 0.6 1 -0.5 0 0.5 1 5.642

5.6422

5.6424

5.6426

5.6428

5.643

5.6432

5.6434

5.6436

5.6438

5.644