x ΜmΝ y ΜmΝ log likelihood

x_{min} = 0.040 ± 0.039 ΜmΝ y_{min} = -0.085 ± 0.045 ΜmΝ z_{min} = 0.734 ± 0.040 ΜmΝ δx_{min} = 7.54 ± 0.37 ΜmΝ δy_{min} = 8.09 ± 0.46 ΜmΝ δz_{min} = 6.91 ± 0.29 ΜmΝ

log likelihood for OM 1 at z = 0.8 m

-2 -1.2

-0.4 0.4 1.2 2 -1 0 1 2 5.92

5.94

5.96

5.98 6 6.02

6.04

6.06