ID Entries Mean RMS

12345 488 -0.5556E-02 0.3861

δx ΜmΝ ID Entries Mean RMS

12345 489 0.9652E-02 0.3419

δy ΜmΝ ID Entries Mean RMS

12345 488 -0.2763 0.5607

δz ΜmΝ

0 5 10 15 20

-1 -0.5 0 0.5 1 1.5

0 10 20 30

-2 -1.5 -1 -0.5 0 0.5 1

0 20 40 60

-5 -4 -3 -2 -1 0 1 2 3