x ΜmΝ y ΜmΝ log likelihood

x_{min} = -0.275 ± 0.209 ΜmΝ y_{min} = 0.402 ± 0.224 ΜmΝ z_{min} = -0.060 ± 0.154 ΜmΝ δx_{min} = 8.70 ± 2.25 ΜmΝ δy_{min} = 9.12 ± 2.55 ΜmΝ δz_{min} = 6.64 ± 1.00 ΜmΝ

log likelihood for OM 344 at z = 0 m

-2 -1.2

-0.4 0.4 1.2 2 -1 0 1 2 5.7 5.72

5.74

5.76

5.78 5.8 5.82

5.84