x ΜmΝ y ΜmΝ log likelihood

x_{min} = -0.072 ± 0.114 ΜmΝ y_{min} = -0.102 ± 0.135 ΜmΝ z_{min} = 0.140 ± 0.105 ΜmΝ δx_{min} = 3.90 ± 0.85 ΜmΝ δy_{min} = 4.19 ± 1.04 ΜmΝ δz_{min} = 3.55 ± 0.65 ΜmΝ

log likelihood for OM 1 at z = 0 m

-2 -1.2

-0.4 0.4 1.2 2 -1 0 1 2 4.6 4.7 4.8 4.9 5 5.1