x ΜmΝ y ΜmΝ log likelihood

x_{min} = 0.112 ± 0.051 ΜmΝ y_{min} = -0.060 ± 0.051 ΜmΝ z_{min} = -0.413 ± 0.047 ΜmΝ δx_{min} = 10.19 ± 0.71 ΜmΝ δy_{min} = 10.33 ± 0.74 ΜmΝ δz_{min} = 9.98 ± 0.65 ΜmΝ

log likelihood for OM 69 at z = -0.4 m

-2 -1.2

-0.4 0.4 1.2 2 -1 0 1 2 6.14

6.15

6.16

6.17

6.18

6.19 6.2 6.21

6.22