x ΜmΝ y ΜmΝ log likelihood

x_{min} = 0.003 ± 0.600 ΜmΝ y_{min} = 0.800 ± 1.534 ΜmΝ z_{min} = -2.000 ± 1.496 ΜmΝ δx_{min} = 20.00 ± 14.23 ΜmΝ δy_{min} = 20.00 ± 12.23 ΜmΝ δz_{min} = 13.90 ± 1.91 ΜmΝ

log likelihood for OM 339 at z = -2 m

-2 -1.2

-0.4 0.4 1.2 2 -1 0 1 2 6.08

6.09 6.1 6.11

6.12

6.13