ver. 6.016 curved surface with θ Γ 90 with magnetic field ver. 6.016 curved surface with θ Γ 90 w/o magnetic field

cos θ entries

10^4

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1