deviation in ϕ from direction of primary with magnetic field

θ Μ degrees Ν w/o magnetic field

-1.5 -1 -0.5 0 0.5 1 1.5

0 20 40 60 80 100 120 140 160 180

-1.5 -1 -0.5 0 0.5 1 1.5

0 20 40 60 80 100 120 140 160 180