DPMJET HDPM NEXUS QGSJET

SIBYLL VENUS

DPMJET

HDPM

NEXUS

QGSJET

SIBYLL

VENUS mamint kgm

file number spectral index correction Μ ⋅ 10 ^{-1} Ν

-3

-2

-1

0

1

2

3

20 25 30 35 40 45 50 55 60