full CORSIKA+MMC E^{-2.76}, θ=0, center

E^{-2.76}, θ=45, -200 m E^{-2.76}, θ=45, center

muon energy lost inside the detector Μ GeV Ν entries

10^2

10^3

10^4

10^{-1} 1 10 10^2 10^3