muon energy at the center of the detector Μ GeV Ν muon energy loss inside the detector Μ GeV Ν muon energy at the top of the detector Μ GeV Ν

10^2

10^3

10^{-1} 1 10 10^2 10^3 10^4 10^5

1 10 10^2

10^3

10^{-1} 1 10 10^2 10^3 10^4 10^5