AMANDA-B/II Vertical Ice Map

z ΜmΝ horizontal projection ΜmΝ

no direct measurement

-100 -50 0 50 100

-700

-600

-500

-400

-300

-200

-100 0 100 200 300 400 500 600

b_e = 1/λ_e Μm^{-1}Ν

λ = 532 nm

1100 1200 1300 1400 1500 1600 1700 1800 1900 2000 2100 2200 2300 2400

depth ΜmΝ

10^{-1}