N ⋅ exp( -dt/τ ) N = 46165.4 τ = 0.0139463 ΜsΝ true rate is 71.7038 ΜHzΝ data rate is 60.799 ΜHzΝ live time is 84.7919 %

time deltas Μ s Ν number of events

1

10

10^2

10^3

10^4

10^5

0.02 0.04 0.06 0.08 0.1 0.12 0.14