E_{cut}=500 MeV integral function Μcm/MeVΝ

E_{cut}=500 MeV

energy ΜGeVΝ tracking integral ΜcmΝ

-0.7

-0.6

-0.5

-0.4

-0.3

-0.2

-0.1 0

1 10 10^2 10^3 10^4 10^5 10^6 10^7 10^8 10^910^{10}10^{11}

10^{-1} 1 10 10^2

10^3

10^4

10^5

10^6

10^7

10^8

10^9

10^{10}

10^{11}

10^{12}

10^{13}

1 10 10^2 10^3 10^4 10^5 10^6 10^7 10^8 10^910^{10}10^{11}