muon fluxsum cm^{-2}sr^{-1}s^{-1}

Muon energy Μ GeV Ν diff. between models

10^{-13}

10^{-11}

10^{-9}

10^{-7}

10^3 10^4

0 0.1 0.2 0.3 0.4 0.5

10^3 10^4