diff. between models method 2 method 1

Energy of the primary Μ TeV Ν

Int. flux m^{-2}sr^{-1}s^{-1} method 2 method 1

0 0.1 0.2 0.3 0.4

10^{-1} 1 10 10^2 10^3

10^{-9}

10^{-7}

10^{-5}

10^{-3}

10^{-1}

10^{-1} 1 10 10^2 10^3