centroid time delta Μ ns Ν crossover

le intercept le threshold

global time Μ ns Ν

5400

5500

5600

5700

5800

5900

6000

6100

6200

6300 x 10^2

1500 2000 2500 3000 3500 x 10^8

5400

5500

5600

5700

5800

5900

6000

6100

6200

6300 x 10^2

1500 2000 2500 3000 3500 x 10^8

5400

5500

5600

5700

5800

5900

6000

6100

6200

6300 x 10^2

1500 2000 2500 3000 3500 x 10^8

5400

5500

5600

5700

5800

5900

6000

6100

6200

6300 x 10^2

1500 2000 2500 3000 3500 x 10^8

centroid clock frequency drift Μ μs/s Ν crossover

le intercept le threshold

global time Μ ns Ν

0.4272

0.4274

0.4276

0.4278

0.428

0.4282

0.4284

0.4286

0.4288

0.429

1500 2000 2500 3000 3500 x 10^8

0.4272

0.4274

0.4276

0.4278

0.428

0.4282

0.4284

0.4286

0.4288

1500 2000 2500 3000 3500 x 10^8

0.4274

0.4276

0.4278

0.428

0.4282

0.4284

0.4286

0.4288

1500 2000 2500 3000 3500 x 10^8

0.4274

0.4276

0.4278

0.428

0.4282

0.4284

0.4286

0.4288

0.429

0.4292

1500 2000 2500 3000 3500 x 10^8