global time Μ ns Ν

OM number

0 10 20 30 40 50 60 70 80 90

6500 7000 7500 8000 8500 x 10^8

global time Μ ns Ν

OM number

0 10 20 30 40 50 60 70 80 90

0 2000 4000 6000 8000 10000 x 10^5

global time Μ ns Ν

OM number

0 10 20 30 40 50 60 70 80 90

0 2000 4000 6000 8000 10000 x 10^3