dx Μ m Ν entries average=-0.230 spread=20.425

dy Μ m Ν average= 4.563 spread=20.088

0 250 500 750 1000

1250

1500

1750

2000

2250

-50 -40 -30 -20 -10 0 10 20 30 40 50

0 500 1000

1500

2000

2500

-50 -40 -30 -20 -10 0 10 20 30 40 50