dx Μ m Ν entries average=-2.148 spread=15.174

dy Μ m Ν average= 5.032 spread=14.373

0 20 40 60 80 100 120 140 160 180

-50 -40 -30 -20 -10 0 10 20 30 40 50

0 25 50 75 100 125 150 175 200

-50 -40 -30 -20 -10 0 10 20 30 40 50