x ΜmΝ y ΜmΝ hit fraction

x_{min} = 5.731 ± 0.245 ΜmΝ y_{min} = 12.186 ± 0.255 ΜmΝ z_{min} = -80.000 ± 0.133 ΜmΝ δx = 21.32 ± 0.09 ΜmΝ δy = 21.50 ± 0.10 ΜmΝ δz = 100.34 ± 1.25 ΜmΝ δxy = 0.041 ± 0.004 δyz = 0.871 ± 0.006 δxz = 0.125 ± 0.014 in z=0 plane minimum is at x= 4.214 y=-2.672

log likelihood for OM 340 at z = 0 m

-40-30

-20-10

0 10

20 30 40

-30 -20 -10 0 10 20 30 40

0.2 0.4 0.6 0.8 1 1.2