x ΜmΝ y ΜmΝ hit fraction

A = 1.410 ± 0.006 θ = 10.983 ± 0.120 ϕ = -94.352 ± 0.650 δr = 5.229 ± 0.018 ΜmΝ δx = 0.380 ± 0.013 ΜmΝ δy = 0.528 ± 0.013 ΜmΝ

log likelihood for OM 340 at z = 0 m

-40-30

-20-10

0 10

20 30 40

-30 -20 -10 0 10 20 30 40 0 0.25 0.5 0.75 1 1.25 1.5 1.75