x ΜmΝ y ΜmΝ hit fraction

A = 1.232 ± 0.009 θ = 10.221 ± 0.306 ϕ = 86.456 ± 1.650 δr = 6.441 ± 0.043 ΜmΝ δx = 0.341 ± 0.032 ΜmΝ δy = 0.626 ± 0.034 ΜmΝ

log likelihood for OM 340 at z = 0 m

-40-30

-20-10

0 10

20 30 40

-30 -20 -10 0 10 20 30 40 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6