x ΜmΝ y ΜmΝ hit fraction

A = 2.027 ± 0.020 θ = 9.628 ± 0.252 ϕ = -94.467 ± 1.475 δr = 4.109 ± 0.030 ΜmΝ δx = 0.575 ± 0.026 ΜmΝ δy = 0.206 ± 0.028 ΜmΝ

log likelihood for OM 340 at z = 0 m

-40-30

-20-10

0 10

20 30 40

-30 -20 -10 0 10 20 30 40

0 0.5 1 1.5 2 2.5